Title: Establish a checklist to improve inspection readiness (e.g., wear and care of the uniform).
Course: Navy JROTC II (09102) > Section: Demonstrating U.S. Navy Traditions, Customs, and Courtesies

Checklist should include Navy standards for wear and care of the

- coat
- trousers or slacks
- skirt
- shirt and sleeves
- undershirt
- neckwear
- hat/helmet/cap
- belt, brass, buckle
- socks
- shoes
- insignia
- awards.

Process/Skill Questions:

- What are inspectors examining during uniform inspections?
- How and when is the uniform worn?
- How is the uniform prepared for inspection?