Title: Explain the process for making stock reagents and solutions.
Course: Biomedical Technician (14900) > Section: Performing Basic Laboratory Skills

Explanation should include the steps involved in the process for making stock reagents and solutions, to include weighing and measuring, as well as the importance of accuracy and precision throughout the process. Explanation should also cover dilution techniques and the purpose for reagents.

Process/Skill Questions:

- How would a biomedical technician mix a working solution from a 10X concentrated solution? What is this solution used for?
- What dilution techniques are commonly used when mixing reagents and solutions?
- What is the procedure for weighing and measuring when making stock reagents and solutions?