Title: Syllabus
Course: Biomedical Technician (14900)

Copyright 2017

Course Code: 8347

Suggested Grade Level: 11 or 12

Duration: 36 weeks

Recommended Prerequisites: Biotechnology Foundations 8344

Course Description:

In Biomedical Technician, students gain foundational knowledge and skills appropriate for a variety of medical-related career paths in the field of biotechnology. They are introduced to diagnostic and therapeutic laboratory procedures that support bioscience research and practice, and they investigate safety, quality assurance, and ethical concerns associated with the field of biomedical technology.