Title: Sterilize reagents and equipment.
Course: Biomedical Technician (14900) > Section: Performing Basic Laboratory Skills

Sterilization of reagents and equipment includes using an autoclave, flame, and/or chemical disinfection to maintain sterile conditions. It should also include strict adherence to manufacturers’ instructions for all devices.

Process/Skill Questions:

- Why is it important for a biomedical technician to clean his or her work area?
- Which sterilization methods should be used for specific materials?
- How would the biomedical technician determine which method to use?
- What are the steps for the various sterilization methods?
- What safety measures must be taken with various sterilization techniques? Why?