Title: Service a carburetor and/or fuel injection system.
Course: Small Engine Repair (20110-36) > Section: Repairing Carburetors and/or Fuel Injection Systems

Service should include

- examination
- adjustment (if applicable)
- cleaning
- replacement of parts

and be done in accordance with the manufacturer’s specifications and servicing procedures, using industry standards and instructor guidelines.

Process/Skill Questions:

- What are some visual or operational signs exhibited by a carburetor that would require it to be serviced?
- What are some considerations to keep in mind, before servicing the carburetor or fuel injection system?
- Why would a technician remove the carburetor from the engine to service it?
- Why are extra components placed in carburetor rebuild kits, which may not be needed, for a carburetor in need of repair?