Title: Evaluate and service the fuel system.
Course: Small Engine Repair (20110-36) > Section: Examining Functions and Types of Fuel Systems

Evaluation should include examination of all components for physical and/or chemical damage, and servicing in accordance with manufacturer's specifications, current industry standards, safety precautions and procedures, and instructor guidelines.

Process/Skill Questions:

- What are the signs or indicators of physical and/or chemical damage to fuel system components?
- When would one clean/service a component vs. replacing it?