Title: Sports Medicine/Athletic Training I (Condensed) (14062-IA)

Demonstrating Personal Qualities and Abilities
  Demonstrate creativity and innovation.
  Demonstrate critical thinking and problem solving.
  Demonstrate initiative and self-direction.
  Demonstrate integrity.
  Demonstrate work ethic.
  WorkplaceReadinessSkillsPoster2019.pdf
Demonstrating Interpersonal Skills
  Demonstrate conflict-resolution skills.
  Demonstrate listening and speaking skills.
  Demonstrate respect for diversity.
  Demonstrate customer service skills.
  Collaborate with team members.
Demonstrating Professional Competencies
  Demonstrate big-picture thinking.
  Demonstrate career- and life-management skills.
  Demonstrate continuous learning and adaptability.
  Manage time and resources.
  Demonstrate information-literacy skills.
  Demonstrate an understanding of information security.
  Maintain working knowledge of current information-technology (IT) systems.
  Demonstrate proficiency with technologies, tools, and machines common to a specific occupation.
  Apply mathematical skills to job-specific tasks.
  Demonstrate professionalism.
  Demonstrate reading and writing skills.
  Demonstrate workplace safety.
Examining All Aspects of an Industry
  Examine aspects of planning within an industry/organization.
  Examine aspects of management within an industry/organization.
  Examine aspects of financial responsibility within an industry/organization.
  Examine technical and production skills required of workers within an industry/organization.
  Examine principles of technology that underlie an industry/organization.
  Examine labor issues related to an industry/organization.
  Examine community issues related to an industry/organization.
  Examine health, safety, and environmental issues related to an industry/organization.
Addressing Elements of Student Life
  Identify the purposes and goals of the student organization.
  Explain the benefits and responsibilities of membership in the student organization as a student and in professional/civic organizations as an adult.
  Demonstrate leadership skills through participation in student organization activities, such as meetings, programs, and projects.
  Identify Internet safety issues and procedures for complying with acceptable use standards.
Exploring Work-Based Learning
  Identify the types of work-based learning (WBL) opportunities.
  (Optional) Reflect on lessons learned during the WBL experience.
  Explore career opportunities related to the WBL experience.
  (Optional) Participate in a WBL experience, when appropriate.
Obtaining First Aid and CPR/AED Education
  Explain blood-borne pathogens and the importance of universal precautions.
  Comply with the clinical site-specific exposure control plan.
  Explain the role of OSHA in the sports medicine profession.
  Complete a nationally recognized certification for first aid.
  Complete a sports first aid module not included in a typical first aid course.
  Identify the components of a primary and secondary survey.
  Complete a nationally recognized certification in CPR/AED (cardiopulmonary resuscitation/automatic external defibrillator).
Understanding Human Anatomy and Physiology
  Explain the integumentary system.
  Explain the musculoskeletal system.
  Explain the cardiovascular and circulatory systems.
  Explain the respiratory system.
  Explain the nervous system.
  (Optional) Explain the urinary system.
  (Optional) Explain the female reproductive system.
  (Optional) Explain the male reproductive system.
  Explain the lymphatic and immune systems as they relate to inflammatory response after injury.
  (Optional) Explain the digestive system.
  Explain the endocrine system.
  (Optional) Explain the sensory system.
Understanding Nutrition
  Explain basics of nutrition.
  Explain factors that impact nutrition.
  Explain how nutritional needs are impacted by physical activity.
  Explain the relationship between nutrition and injury, illness, and health conditions.
  Perform a nutritional analysis.
  Interpret a nutritional analysis.
Understanding Biomechanics
  Identify lever systems associated with the human body.
  Describe the principles associated with the planes and axes of human movement.
  Identify how force, mass, and gravity relate to human body mechanics.
Understanding Medical Terminology
  Explain medical terminology commonly used in sports medicine.
  Use appropriate medical terminology.
  Explain commonly used prefixes and suffixes in medical terminology.
Understanding Injuries and Illnesses
  Explain that a sprain is an injury to a ligament.
  Explain that a strain is an injury to a muscle or tendon.
  Explain that a fracture is an injury to a bone.
  Demonstrate knowledge of basic taping and wrapping techniques for musculoskeletal injuries.
  Identify catastrophic injuries.
  Identify neurological and brain injuries and conditions.
  Identify infectious and contagious diseases related to physical activity.
  Identify other health conditions that affect participation in physical activity.
  Explain common psychological responses to injury.
Understanding Legal and Ethical Issues in Sports Medicine
  Distinguish among misfeasance, malfeasance, nonfeasance, and acts of commission/omission.
  Explain the legal and ethical significance of documentation and record-keeping in sports medicine.
  Explain the purpose and importance of medical documentation.
  Document the history of an injury.
  Explain the legal and ethical significance of confidentiality in sports medicine.
  Identify the legal practice limitations of student aides vs. paraprofessionals vs. professionals in sports medicine.
  Identify the necessity of client/patient referral to other healthcare professionals and practitioners.
  Explain the implications that Americans with Disabilities Act (ADA) and cultural competence have within the field of sports medicine.
  (Optional) Demonstrate ethical behavior within the sports medicine profession.
Exploring Sports Medicine Careers
  Explain the continuing education requirements in various sports medicine professions.
  Identify organizations relevant to sports medicine professions.
  Identify credentials recognized in the sports medicine profession.
ADDITIONAL COURSE INFORMATION (for instructors only; do not publish for students)
  Student Competency Records (SCR)
  7660 8316 Teacher Resources.pdf
  7660 8316 Standards Correlations.pdf
  7660 8316 Credentials Sequences Clusters.pdf
  7660 7662 8316 8317 Acknowledgments and Copyright Information.pdf