Title: Identify safety precautions and devices associated with computer use.
Course: Computer Information Systems (10005-I) > Section: Managing Computer Systems

Identification includes computer-related items that ensure personal and equipment safety such as

- surge protectors and uninterruptible power supply (UPS)
- anti-static mats and pads
- malware protection software
- electric cords and wiring.