Title: Explain the endocrine system.
Course: Sports Medicine/Athletic Training I (14062-I) > Section: Understanding Human Anatomy and Physiology

Explanation should include naming and discussing the function of each part of the endocrine system.

Process/Skill Questions:

- What are the parts of this system?
- What is the function of each part?
- What are the common injuries and pathological conditions of this system?
- What are signs and symptoms of the different injuries and conditions?
- What are different tests used to assess for these injuries and conditions?
- What are clinical procedures used to treat these injuries and conditions?

NASM-Certified Personal Trainer

Chapter 2 Basic Exercise Science

- Define the components of the human movement system (kinetic chain).
- Explain the basic structure and function of
  - the nervous system
  - the skeletal system
  - he muscular system
  - the endocrine system.
- Describe how these systems respond and adapt to exercise.