Title: Describe specialty tests.
Course: Vision Care Technician I (14057-I) > Section: Exploring Clinical Practice

Description should include

- pinhole test
- super pinhole test
- Amsler Grid
- BAT test
- stereopsis test
- Ishihara test
- Humphrey visual field (A)
- Ocular Coherence Tomography (A)
- A and B scan (A)
- Schirmer Test
- Fundus Photography (A)
- Fluorescein Angiography (A)
- Orbscans/Cornealtopography
- pachymetry
- keratometry.

Process/Skill Questions:

- What is the function of an Amsler Grid?
- What equipment is necessary for each test?
- What patient preparation is necessary for each test? Equipment preparation?