Title: Manage equipment and machinery to minimize energy consumption, maximize function, and protect water and other natural resources.
Course: Landscaping I (18054-I) > Section: Constructing the Landscape

Management should include

- selecting and maintaining equipment
- ensuring access to product/equipment owner’s manuals
- developing a calibration schedule for spreading and spraying equipment.

Process/Skill Questions:

- Why are calibration schedules important for spreaders and spraying equipment?
- How does ensuring proper calibration of equipment assist with the protection of water and other natural resources?