Title: (Optional) Perform equipment maintenance.
Course: Turfgrass Management, Advanced (18054-IV) > Section: Managing a Turf Facility

Performance may include

- preventive maintenance
- repairs and adjustments
- reel or rotary sharpening
- troubleshooting problems.

Process/Skill Questions:

- Why is preventive maintenance important in the turf industry?
- How does a preventive maintenance plan help with the overall condition of a piece of equipment?