Title: Prepare a facility plan.
Course: Equine Science, Advanced (18104-II) > Section: Managing the Stable

Preparation of a facility plan should include

- stall sizes
- characteristics of stall construction
- location of a barn and reasons for selecting the location
- storage space requirements
- requirements for feed and bedding.

Process/Skill Questions:

- How is the size of a stall determined?
- What are important factors to consider when selecting the location for a barn?