Title: Describe the process for receiving inventory.
Course: Sterile Processing Technician (14021) > Section: Performing Sterile Storage and Inventory Management

Description should include

- what compromises integrity (e.g., holes, damaged or missing filters, broken locks and seals, water damage, dust)
- external indicators and expiration dates
- matching the delivery document to what was received (e.g., signing for deliveries).