Title: Describe standards for record maintenance.
Course: Sterile Processing Technician (14021) > Section: Documenting Processes and Procedures

Description should include

- protocol of time frame to keep records
- what records should be kept
- where records should be kept (e.g., on-site, off-site)
- how to retrieve records.

Process/Skill Questions:

- What is the purpose of maintaining documentation in the sterile processing department?
- When might documentation need to be retrieved?
- When are biological results recorded?