Title: Describe the process and requirements for obtaining industry certifications related to the Sterile Processing Technician course.
Course: Sterile Processing Technician (14021) > Section: Preparing for Industry Certification

The description should include a list of industry certifications related to the course and the process/requirements for obtaining the certifications from

- official websites of the testing organization/vendor
- materials from publishers that have developed practice materials and tests based on information from the testing organization/vendor
- information from certified instructors or industry-certified professionals
- information in the “Introduction/Course Description” section of this document.

Process/Skill Questions:

- What types of certification are available?
- What are the requirements for eligibility for each certification process?
- What is the time frame for certification?