Title: Identify the three levels of the Spaulding Classification.
Course: Sterile Processing Technician (14021) > Section: Preparing Instruments for Decontamination and Disinfection

Identification should include

- the levels (non-critical, semi-critical, and critical)
- how to mix and test chemicals
- documentation of chemical testing
- identifying the disinfectant family.

Process/Skill Questions:

- Why are there three levels of Spaulding Classification?