Title: Unload the sterilizer.
Course: Sterile Processing Technician (14021) > Section: Exploring the Sterilization Process

Unloading should include

- mechanisms used to maintain sterility (e.g. cooling time, temperature, handling)
- body mechanics
- ergonomics
- monitoring of traffic flow
- use of PPE.