Title: Identify testing skills/strategies for a certification examination.
Course: Sterile Processing Technician (14021) > Section: Preparing for Industry Certification

The identification of testing skills and strategies should be undertaken by

- conducting an Internet research project
- reviewing materials from publishers
- interviewing certified instructors and/or industry-certified professionals.

Process/Skill Questions:

- Where are practice exams found?
- How do you determine the content used for exam questions?