Title: Successfully complete an industry certification examination representative of skills learned in this course (e.g., Certified Registered Central Service Technician exam).
Course: Sterile Processing Technician (14021) > Section: Preparing for Industry Certification

The successful completion of an industry certification examination will be achieved when the student applicant earns an examination score deemed “passing” by the testing organization. Qualifying examinations are those currently approved at the state level as representative of sterile processing technician skills.

Students should be encouraged to attain industry certification as evidence of their computer application skill level and general employability.

Process/Skill Questions:

- Where are credentials recorded?
- How often are credentials renewed?