Title: (Optional) Operate arc-welding equipment.
Course: Agriscience and Technology (18001-18A) > Section: Understanding Agricultural Mechanics

Operation includes

- following welding safety procedures
- selecting equipment necessary for welding
- striking an arc and running a bead.

Process/Skill Questions:

- What are examples of situations where welding is necessary in agriculture?
- What number filter lens is necessary when arc welding?
- How can a worker protect others that are in the welding area when welding is occurring?
- What are different methods for running a bead?
- What equipment is necessary when welding (in addition to PPE)?