Title: (Optional) Assist with the installation of a farm water system.
Course: Livestock Production Management (18301-II) > Section: Using Mechanics in Agricultural Production

Assisting with the installation of a farm water or irrigation system should include

- selecting the appropriate water or irrigation system
- designing and determining cost of the system
- installing mechanical systems needed for watering and irrigation system (e.g., pumps, pressure switches, pressure tanks, regulators, lines, valves, timers, livestock fountains, sprinkler heads)
- testing the system for leaks and proper operation.

Process/Skill Questions:

- What factors should be considered when installing farm watering systems?
- Why are controls (e.g., pressure switches, valves, timers) important on water systems?
- What is the most inhibiting factor when installing water systems for production agriculture operations?
- What is the most effective way of checking for leaks?