Title: Describe a bioremediation and biorestoration system.
Course: Biotechnology Foundations in Agricultural and Environmental Science (18308-II) > Section: Exploring Biotechnology in Environmental Science

Description should include

- the definition of bioremediation and biorestoration
- examples of a bioremediation system
- examples of a biorestoration system.

Process/Skill Questions:

- What are examples of bioremediation systems?
- What is the difference between bioremediation and biorestoration?
- What are some circumstances when one system may be selected over the other?
- How can a bioremediation system positively and/or negatively affect the environment?