Title: Syllabus
Course: Carpentry I (17003-I)

Copyright: 2020

Suggested Grade Level: 10, 11

Duration: 36 weeks/140 hours

Prerequisites: None

Course Description:

Carpentry I is foundational for achieving high-level construction industry skills that can result in an exciting and lucrative career. With an emphasis on safety, students are taught to use hand and power tools, cut stock, apply construction mathematics, interpret blueprints, and understand basic rigging. Students will become proficient in identifying types of residential construction components to frame walls, floors, ceilings, roofs, doors, and windows. All students will obtain the required Construction Industry OSHA 10 safety credential.

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," (https://law.lis.virginia.gov/admincode/title8/agency20/chapter120/section150/) or contact the Virginia Department of Education Office of Career, Technical and Adult Education at cte@doe.virginia.gov.