Title: (Optional) Identify tools, equipment, and supplies used in the construction and repair of electrical circuits and equipment.
Course: Applied Agricultural Concepts (18002-I) > Section: Performing Electrical Operations

Identification should include the names, purposes, and terminology for tools, equipment, and supply items used for installation and repairs of fixtures and circuits.

Process/Skill Questions:

- Why are tools used for electrical work insulated?
- What determines the electrical fixture selection for a given application?
- What is the difference between a common name and a brand name?